; Waw.def : Declares the module parameters for the DLL.

LIBRARY

DESCRIPTION  'Waw Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
		WAW_fn_vInitModule
		WAW_fn_vInitWatchWindow
		WAW_fn_vRefreshWatchWindow

